<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">NAME XTrkCad
DESCRIPTION 'xtrkcad'
EXETYPE WINDOWS
STUB 'WINSTUB.EXE'
CODE MOVEABLE DISCARDABLE
DATA MOVEABLE MULTIPLE
HEAPSIZE 2048
STACKSIZE 10240
EXPORTS
	MainWndProc	@1
	About		@2
</pre></body></html>